/*
 Navicat Premium Data Transfer

 Source Server         : mysql57
 Source Server Type    : MySQL
 Source Server Version : 50732
 Source Host           : 127.0.0.1:3306
 Source Schema         : nacos

 Target Server Type    : MySQL
 Target Server Version : 50732
 File Encoding         : 65001

 Date: 17/08/2022 18:13:57
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for config_info
-- ----------------------------
DROP TABLE IF EXISTS `config_info`;
CREATE TABLE `config_info`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `content` longtext CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'content',
  `md5` varchar(32) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '创建时间',
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8 COLLATE utf8_bin NULL COMMENT 'source user',
  `src_ip` varchar(50) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'source ip',
  `app_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT '租户字段',
  `c_desc` varchar(256) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `c_use` varchar(64) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `effect` varchar(64) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `type` varchar(64) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `c_schema` text CHARACTER SET utf8 COLLATE utf8_bin NULL,
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfo_datagrouptenant`(`data_id`, `group_id`, `tenant_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 14 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = 'config_info' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of config_info
-- ----------------------------
INSERT INTO `config_info` VALUES (9, 'zyjblogs-oauth-test.yml', 'public', 'server:\n  port: 9029\nspring:\n  devtools:\n    add-properties: true\n  application:\n    name: zyjblogs-oauth\n  datasource:\n    driver-class-name: com.mysql.cj.jdbc.Driver\n    url: jdbc:mysql://127.0.0.1:3306/zyjblogs_rbac?useSSL=false&useUnicode=true&characterEncoding=utf-8&zeroDateTimeBehavior=convertToNull&transformedBitIsBoolean=true&autoReconnect=true&failOverReadOnly=false&allowMultiQueries=true&serverTimezone=GMT%2B8\n    username: root\n    password: [REDACTED]  redis:\n    host: 127.0.0.1\n    port: 6379\n    password: \n    timeout: 10000 #连接超时时间（毫秒）\n    lettuce:\n      pool:\n        max-active: 8 # 连接池最大连接数\n        max-wait: -1ms  # 连接池最大阻塞等待时间（使用负值表示没有限制）\n        min-idle: 0 # 连接池中的最小空闲连接\n        max-idle: 8 # 连接池中的最大空闲连接\n    # sentinel:\n    #   master: ${hatech.global.redis.sentinel.master}\n    #   nodes: ${hatech.global.redis.sentinel.nodes}\n    #   password: ${hatech.global.redis.sentinel.password}\nmybatis-plus:\n  mapper-locations: classpath:mapper/**/*.xml\n  global-config:\n    db-config:\n      #主键策略：assign_id(雪花算法)、assign_uuid（去下划线的UUID）\n      id-type: assign_id\n  configuration:\n    # 是否开启自动驼峰命名规则映射:从数据库列名到Java属性驼峰命名的类似映射\n    map-underscore-to-camel-case: true\n    # 如果查询结果中包含空值的列，则 MyBatis 在映射的时候，不会映射这个字段\n    call-setters-on-nulls: false\n    # 这个配置会将执行的sql打印出来，在开发或测试的时候可以用\n    # log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\n    log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\nfeign:\n  sentinel:\n    enabled: true\n\nribbon:\n  ReadTimeout: 6000               # 请求处理的超时时间\n  ConnectTimeout: 3000            # 请求连接的超时时间\n  MaxAutoRetries: 1               # 重试策略先尝试访问首选实例一次,失败后才会更换实例访问\n  MaxAutoRetriesNextServer: 1     # 更换实例访问的次数：通过参数设置为2, 所以会尝试更换2次实例进行重试\n  OkToRetryOnAllOperations: true  # 开启对请求进行行重试\n\n\nmanagement:\n  health:\n    ldap:\n      enabled: false\n  endpoints:\n    web:\n      exposure:\n        include: \'health\'\n  endpoint:\n    health:\n      show-details: always', '713b49c57ee2be922797bfca5df170fb', '2022-08-17 17:35:05', '2022-08-17 17:57:11', 'nacos', '127.0.0.1', '', 'test', '', '', '', 'yaml', '');
INSERT INTO `config_info` VALUES (10, 'zyjblogs-global-test.yml', 'global', 'none', '334c4a4c42fdb79d7ebc3e73b517e6f8', '2022-08-17 17:35:39', '2022-08-17 17:35:39', 'nacos', '127.0.0.1', '', 'test', NULL, NULL, NULL, 'text', NULL);
INSERT INTO `config_info` VALUES (12, 'zyjblogs-rbac-test.yml', 'public', 'server:\r\n  port: 9039\r\nspring:\r\n  devtools:\r\n    add-properties: true\r\n  application:\r\n    name: zyjblogs-rbac\r\n  datasource:\r\n    driver-class-name: com.mysql.cj.jdbc.Driver\r\n    url: jdbc:mysql://127.0.0.1:3306/zyjblogs_rbac?useSSL=false&useUnicode=true&characterEncoding=utf-8&zeroDateTimeBehavior=convertToNull&transformedBitIsBoolean=true&autoReconnect=true&failOverReadOnly=false&allowMultiQueries=true&serverTimezone=GMT%2B8\r\n    username: root\r\n    password: [REDACTED]  mapper-locations: classpath:mapper/**/*.xml\r\n  global-config:\r\n    db-config:\r\n      #主键策略：assign_id(雪花算法)、assign_uuid（去下划线的UUID）\r\n      id-type: assign_id\r\n  configuration:\r\n    # 是否开启自动驼峰命名规则映射:从数据库列名到Java属性驼峰命名的类似映射\r\n    map-underscore-to-camel-case: true\r\n    # 如果查询结果中包含空值的列，则 MyBatis 在映射的时候，不会映射这个字段\r\n    call-setters-on-nulls: false\r\n    # 这个配置会将执行的sql打印出来，在开发或测试的时候可以用\r\n    # log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\r\n    log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\r\nfeign:\r\n  sentinel:\r\n    enabled: true\r\n\r\nribbon:\r\n  ReadTimeout: 6000               # 请求处理的超时时间\r\n  ConnectTimeout: 3000            # 请求连接的超时时间\r\n  MaxAutoRetries: 1               # 重试策略先尝试访问首选实例一次,失败后才会更换实例访问\r\n  MaxAutoRetriesNextServer: 1     # 更换实例访问的次数：通过参数设置为2, 所以会尝试更换2次实例进行重试\r\n  OkToRetryOnAllOperations: true  # 开启对请求进行行重试\r\n\r\n\r\nmanagement:\r\n  health:\r\n    ldap:\r\n      enabled: false\r\n  endpoints:\r\n    web:\r\n      exposure:\r\n        include: \'health\'\r\n  endpoint:\r\n    health:\r\n      show-details: always', 'bfd132739c919b446e0256345adad019', '2022-08-17 17:48:38', '2022-08-17 17:48:38', 'nacos', '127.0.0.1', '', 'test', NULL, NULL, NULL, 'yaml', NULL);

-- ----------------------------
-- Table structure for config_info_aggr
-- ----------------------------
DROP TABLE IF EXISTS `config_info_aggr`;
CREATE TABLE `config_info_aggr`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'group_id',
  `datum_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'datum_id',
  `content` longtext CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT '内容',
  `gmt_modified` datetime(0) NOT NULL COMMENT '修改时间',
  `app_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT '租户字段',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfoaggr_datagrouptenantdatum`(`data_id`, `group_id`, `tenant_id`, `datum_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = '增加租户字段' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of config_info_aggr
-- ----------------------------

-- ----------------------------
-- Table structure for config_info_beta
-- ----------------------------
DROP TABLE IF EXISTS `config_info_beta`;
CREATE TABLE `config_info_beta`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'group_id',
  `app_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'content',
  `beta_ips` varchar(1024) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'betaIps',
  `md5` varchar(32) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '创建时间',
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8 COLLATE utf8_bin NULL COMMENT 'source user',
  `src_ip` varchar(50) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'source ip',
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT '租户字段',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfobeta_datagrouptenant`(`data_id`, `group_id`, `tenant_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = 'config_info_beta' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of config_info_beta
-- ----------------------------

-- ----------------------------
-- Table structure for config_info_tag
-- ----------------------------
DROP TABLE IF EXISTS `config_info_tag`;
CREATE TABLE `config_info_tag`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'group_id',
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT 'tenant_id',
  `tag_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'tag_id',
  `app_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'content',
  `md5` varchar(32) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '创建时间',
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8 COLLATE utf8_bin NULL COMMENT 'source user',
  `src_ip` varchar(50) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'source ip',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfotag_datagrouptenanttag`(`data_id`, `group_id`, `tenant_id`, `tag_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = 'config_info_tag' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of config_info_tag
-- ----------------------------

-- ----------------------------
-- Table structure for config_tags_relation
-- ----------------------------
DROP TABLE IF EXISTS `config_tags_relation`;
CREATE TABLE `config_tags_relation`  (
  `id` bigint(20) NOT NULL COMMENT 'id',
  `tag_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'tag_name',
  `tag_type` varchar(64) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'tag_type',
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'group_id',
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT 'tenant_id',
  `nid` bigint(20) NOT NULL AUTO_INCREMENT,
  PRIMARY KEY (`nid`) USING BTREE,
  UNIQUE INDEX `uk_configtagrelation_configidtag`(`id`, `tag_name`, `tag_type`) USING BTREE,
  INDEX `idx_tenant_id`(`tenant_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = 'config_tag_relation' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of config_tags_relation
-- ----------------------------

-- ----------------------------
-- Table structure for group_capacity
-- ----------------------------
DROP TABLE IF EXISTS `group_capacity`;
CREATE TABLE `group_capacity`  (
  `id` bigint(20) UNSIGNED NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `group_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL DEFAULT '' COMMENT 'Group ID，空字符表示整个集群',
  `quota` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '配额，0表示使用默认值',
  `usage` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '使用量',
  `max_size` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个配置大小上限，单位为字节，0表示使用默认值',
  `max_aggr_count` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '聚合子配置最大个数，，0表示使用默认值',
  `max_aggr_size` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个聚合数据的子配置大小上限，单位为字节，0表示使用默认值',
  `max_history_count` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '最大变更历史数量',
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '创建时间',
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '修改时间',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_group_id`(`group_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = '集群、各Group容量信息表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of group_capacity
-- ----------------------------

-- ----------------------------
-- Table structure for his_config_info
-- ----------------------------
DROP TABLE IF EXISTS `his_config_info`;
CREATE TABLE `his_config_info`  (
  `id` bigint(64) UNSIGNED NOT NULL,
  `nid` bigint(20) UNSIGNED NOT NULL AUTO_INCREMENT,
  `data_id` varchar(255) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL,
  `group_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL,
  `app_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8 COLLATE utf8_bin NOT NULL,
  `md5` varchar(32) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0),
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0),
  `src_user` text CHARACTER SET utf8 COLLATE utf8_bin NULL,
  `src_ip` varchar(50) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `op_type` char(10) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT '租户字段',
  PRIMARY KEY (`nid`) USING BTREE,
  INDEX `idx_gmt_create`(`gmt_create`) USING BTREE,
  INDEX `idx_gmt_modified`(`gmt_modified`) USING BTREE,
  INDEX `idx_did`(`data_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 18 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = '多租户改造' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of his_config_info
-- ----------------------------
INSERT INTO `his_config_info` VALUES (0, 13, 'zyjblogs-oauth-test.yml', 'public', '', 'server:\r\n  port: 9029\r\nspring:\r\n  application:\r\n    name: zyjblogs-oauth\r\n  datasource:\r\n    driver-class-name: com.mysql.cj.jdbc.Driver\r\n    url: jdbc:mysql://127.0.0.1:3306/zyjblogs_rbac?useSSL=false&useUnicode=true&characterEncoding=utf-8&zeroDateTimeBehavior=convertToNull&transformedBitIsBoolean=true&autoReconnect=true&failOverReadOnly=false&allowMultiQueries=true&serverTimezone=GMT%2B8\r\n    username: root\r\n    password: [REDACTED]  mapper-locations: classpath:mapper/**/*.xml\r\n  global-config:\r\n    db-config:\r\n      #主键策略：assign_id(雪花算法)、assign_uuid（去下划线的UUID）\r\n      id-type: assign_id\r\n  configuration:\r\n    # 是否开启自动驼峰命名规则映射:从数据库列名到Java属性驼峰命名的类似映射\r\n    map-underscore-to-camel-case: true\r\n    # 如果查询结果中包含空值的列，则 MyBatis 在映射的时候，不会映射这个字段\r\n    call-setters-on-nulls: false\r\n    # 这个配置会将执行的sql打印出来，在开发或测试的时候可以用\r\n    # log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\r\n    log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\r\nfeign:\r\n  sentinel:\r\n    enabled: true\r\n\r\nribbon:\r\n  ReadTimeout: 6000               # 请求处理的超时时间\r\n  ConnectTimeout: 3000            # 请求连接的超时时间\r\n  MaxAutoRetries: 1               # 重试策略先尝试访问首选实例一次,失败后才会更换实例访问\r\n  MaxAutoRetriesNextServer: 1     # 更换实例访问的次数：通过参数设置为2, 所以会尝试更换2次实例进行重试\r\n  OkToRetryOnAllOperations: true  # 开启对请求进行行重试\r\n\r\n\r\nmanagement:\r\n  health:\r\n    ldap:\r\n      enabled: false\r\n  endpoints:\r\n    web:\r\n      exposure:\r\n        include: \'health\'\r\n  endpoint:\r\n    health:\r\n      show-details: always', '9e77325d3793a367542452cb4aa3610e', '2022-08-17 17:35:05', '2022-08-17 17:35:05', 'nacos', '127.0.0.1', 'I', 'test');
INSERT INTO `his_config_info` VALUES (0, 14, 'zyjblogs-global-test.yml', 'global', '', 'none', '334c4a4c42fdb79d7ebc3e73b517e6f8', '2022-08-17 17:35:38', '2022-08-17 17:35:39', 'nacos', '127.0.0.1', 'I', 'test');
INSERT INTO `his_config_info` VALUES (9, 15, 'zyjblogs-oauth-test.yml', 'public', '', 'server:\r\n  port: 9029\r\nspring:\r\n  application:\r\n    name: zyjblogs-oauth\r\n  datasource:\r\n    driver-class-name: com.mysql.cj.jdbc.Driver\r\n    url: jdbc:mysql://127.0.0.1:3306/zyjblogs_rbac?useSSL=false&useUnicode=true&characterEncoding=utf-8&zeroDateTimeBehavior=convertToNull&transformedBitIsBoolean=true&autoReconnect=true&failOverReadOnly=false&allowMultiQueries=true&serverTimezone=GMT%2B8\r\n    username: root\r\n    password: [REDACTED]  mapper-locations: classpath:mapper/**/*.xml\r\n  global-config:\r\n    db-config:\r\n      #主键策略：assign_id(雪花算法)、assign_uuid（去下划线的UUID）\r\n      id-type: assign_id\r\n  configuration:\r\n    # 是否开启自动驼峰命名规则映射:从数据库列名到Java属性驼峰命名的类似映射\r\n    map-underscore-to-camel-case: true\r\n    # 如果查询结果中包含空值的列，则 MyBatis 在映射的时候，不会映射这个字段\r\n    call-setters-on-nulls: false\r\n    # 这个配置会将执行的sql打印出来，在开发或测试的时候可以用\r\n    # log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\r\n    log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\r\nfeign:\r\n  sentinel:\r\n    enabled: true\r\n\r\nribbon:\r\n  ReadTimeout: 6000               # 请求处理的超时时间\r\n  ConnectTimeout: 3000            # 请求连接的超时时间\r\n  MaxAutoRetries: 1               # 重试策略先尝试访问首选实例一次,失败后才会更换实例访问\r\n  MaxAutoRetriesNextServer: 1     # 更换实例访问的次数：通过参数设置为2, 所以会尝试更换2次实例进行重试\r\n  OkToRetryOnAllOperations: true  # 开启对请求进行行重试\r\n\r\n\r\nmanagement:\r\n  health:\r\n    ldap:\r\n      enabled: false\r\n  endpoints:\r\n    web:\r\n      exposure:\r\n        include: \'health\'\r\n  endpoint:\r\n    health:\r\n      show-details: always', '9e77325d3793a367542452cb4aa3610e', '2022-08-17 17:44:16', '2022-08-17 17:44:17', 'nacos', '127.0.0.1', 'U', 'test');
INSERT INTO `his_config_info` VALUES (0, 16, 'zyjblogs-rbac-test.yml', 'public', '', 'server:\r\n  port: 9039\r\nspring:\r\n  devtools:\r\n    add-properties: true\r\n  application:\r\n    name: zyjblogs-rbac\r\n  datasource:\r\n    driver-class-name: com.mysql.cj.jdbc.Driver\r\n    url: jdbc:mysql://127.0.0.1:3306/zyjblogs_rbac?useSSL=false&useUnicode=true&characterEncoding=utf-8&zeroDateTimeBehavior=convertToNull&transformedBitIsBoolean=true&autoReconnect=true&failOverReadOnly=false&allowMultiQueries=true&serverTimezone=GMT%2B8\r\n    username: root\r\n    password: [REDACTED]  mapper-locations: classpath:mapper/**/*.xml\r\n  global-config:\r\n    db-config:\r\n      #主键策略：assign_id(雪花算法)、assign_uuid（去下划线的UUID）\r\n      id-type: assign_id\r\n  configuration:\r\n    # 是否开启自动驼峰命名规则映射:从数据库列名到Java属性驼峰命名的类似映射\r\n    map-underscore-to-camel-case: true\r\n    # 如果查询结果中包含空值的列，则 MyBatis 在映射的时候，不会映射这个字段\r\n    call-setters-on-nulls: false\r\n    # 这个配置会将执行的sql打印出来，在开发或测试的时候可以用\r\n    # log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\r\n    log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\r\nfeign:\r\n  sentinel:\r\n    enabled: true\r\n\r\nribbon:\r\n  ReadTimeout: 6000               # 请求处理的超时时间\r\n  ConnectTimeout: 3000            # 请求连接的超时时间\r\n  MaxAutoRetries: 1               # 重试策略先尝试访问首选实例一次,失败后才会更换实例访问\r\n  MaxAutoRetriesNextServer: 1     # 更换实例访问的次数：通过参数设置为2, 所以会尝试更换2次实例进行重试\r\n  OkToRetryOnAllOperations: true  # 开启对请求进行行重试\r\n\r\n\r\nmanagement:\r\n  health:\r\n    ldap:\r\n      enabled: false\r\n  endpoints:\r\n    web:\r\n      exposure:\r\n        include: \'health\'\r\n  endpoint:\r\n    health:\r\n      show-details: always', 'bfd132739c919b446e0256345adad019', '2022-08-17 17:48:37', '2022-08-17 17:48:38', 'nacos', '127.0.0.1', 'I', 'test');
INSERT INTO `his_config_info` VALUES (9, 17, 'zyjblogs-oauth-test.yml', 'public', '', 'server:\n  port: 9029\nspring:\n  devtools:\n    add-properties: true\n  application:\n    name: zyjblogs-oauth\n  datasource:\n    driver-class-name: com.mysql.cj.jdbc.Driver\n    url: jdbc:mysql://127.0.0.1:3306/zyjblogs_rbac?useSSL=false&useUnicode=true&characterEncoding=utf-8&zeroDateTimeBehavior=convertToNull&transformedBitIsBoolean=true&autoReconnect=true&failOverReadOnly=false&allowMultiQueries=true&serverTimezone=GMT%2B8\n    username: root\n    password: [REDACTED]  mapper-locations: classpath:mapper/**/*.xml\n  global-config:\n    db-config:\n      #主键策略：assign_id(雪花算法)、assign_uuid（去下划线的UUID）\n      id-type: assign_id\n  configuration:\n    # 是否开启自动驼峰命名规则映射:从数据库列名到Java属性驼峰命名的类似映射\n    map-underscore-to-camel-case: true\n    # 如果查询结果中包含空值的列，则 MyBatis 在映射的时候，不会映射这个字段\n    call-setters-on-nulls: false\n    # 这个配置会将执行的sql打印出来，在开发或测试的时候可以用\n    # log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\n    log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\nfeign:\n  sentinel:\n    enabled: true\n\nribbon:\n  ReadTimeout: 6000               # 请求处理的超时时间\n  ConnectTimeout: 3000            # 请求连接的超时时间\n  MaxAutoRetries: 1               # 重试策略先尝试访问首选实例一次,失败后才会更换实例访问\n  MaxAutoRetriesNextServer: 1     # 更换实例访问的次数：通过参数设置为2, 所以会尝试更换2次实例进行重试\n  OkToRetryOnAllOperations: true  # 开启对请求进行行重试\n\n\nmanagement:\n  health:\n    ldap:\n      enabled: false\n  endpoints:\n    web:\n      exposure:\n        include: \'health\'\n  endpoint:\n    health:\n      show-details: always', '1927b9538ce0dec948d93fce91d46295', '2022-08-17 17:57:11', '2022-08-17 17:57:11', 'nacos', '127.0.0.1', 'U', 'test');

-- ----------------------------
-- Table structure for permissions
-- ----------------------------
DROP TABLE IF EXISTS `permissions`;
CREATE TABLE `permissions`  (
  `role` varchar(50) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL,
  `resource` varchar(255) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL,
  `action` varchar(8) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL,
  UNIQUE INDEX `uk_role_permission`(`role`, `resource`, `action`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8 COLLATE = utf8_unicode_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of permissions
-- ----------------------------

-- ----------------------------
-- Table structure for roles
-- ----------------------------
DROP TABLE IF EXISTS `roles`;
CREATE TABLE `roles`  (
  `username` varchar(50) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL,
  `role` varchar(50) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL,
  UNIQUE INDEX `idx_user_role`(`username`, `role`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8 COLLATE = utf8_unicode_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of roles
-- ----------------------------
INSERT INTO `roles` VALUES ('nacos', 'ROLE_ADMIN');

-- ----------------------------
-- Table structure for tenant_capacity
-- ----------------------------
DROP TABLE IF EXISTS `tenant_capacity`;
CREATE TABLE `tenant_capacity`  (
  `id` bigint(20) UNSIGNED NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL DEFAULT '' COMMENT 'Tenant ID',
  `quota` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '配额，0表示使用默认值',
  `usage` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '使用量',
  `max_size` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个配置大小上限，单位为字节，0表示使用默认值',
  `max_aggr_count` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '聚合子配置最大个数',
  `max_aggr_size` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个聚合数据的子配置大小上限，单位为字节，0表示使用默认值',
  `max_history_count` int(10) UNSIGNED NOT NULL DEFAULT 0 COMMENT '最大变更历史数量',
  `gmt_create` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '创建时间',
  `gmt_modified` datetime(0) NOT NULL DEFAULT CURRENT_TIMESTAMP(0) COMMENT '修改时间',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_tenant_id`(`tenant_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = '租户容量信息表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of tenant_capacity
-- ----------------------------

-- ----------------------------
-- Table structure for tenant_info
-- ----------------------------
DROP TABLE IF EXISTS `tenant_info`;
CREATE TABLE `tenant_info`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT 'id',
  `kp` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NOT NULL COMMENT 'kp',
  `tenant_id` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT 'tenant_id',
  `tenant_name` varchar(128) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT '' COMMENT 'tenant_name',
  `tenant_desc` varchar(256) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'tenant_desc',
  `create_source` varchar(32) CHARACTER SET utf8 COLLATE utf8_bin NULL DEFAULT NULL COMMENT 'create_source',
  `gmt_create` bigint(20) NOT NULL COMMENT '创建时间',
  `gmt_modified` bigint(20) NOT NULL COMMENT '修改时间',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_tenant_info_kptenantid`(`kp`, `tenant_id`) USING BTREE,
  INDEX `idx_tenant_id`(`tenant_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 2 CHARACTER SET = utf8 COLLATE = utf8_bin COMMENT = 'tenant_info' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of tenant_info
-- ----------------------------
INSERT INTO `tenant_info` VALUES (1, '1', 'test', 'test', 'test', 'nacos', 1660727417529, 1660727417529);

-- ----------------------------
-- Table structure for users
-- ----------------------------
DROP TABLE IF EXISTS `users`;
CREATE TABLE `users`  (
  `username` varchar(50) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL,
  `password` varchar(500) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL,
  `enabled` tinyint(1) NOT NULL,
  PRIMARY KEY (`username`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8 COLLATE = utf8_unicode_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of users
-- ----------------------------
INSERT INTO `users` VALUES ('nacos', '$2a$10$EuWPZHzz32dJN7jexM34MOeYirDdFAZm2kuWj7VEOJhhZkDrxfvUu', 1);

SET FOREIGN_KEY_CHECKS = 1;
